import { DoctorGuard } from '@kit/doctor/components/doctor-guard';
import { PageBody, PageHeader } from '@kit/ui/page';
import { Trans } from '@kit/ui/trans';

function DoctorPage() {
  return (
    <>
      <PageHeader description={<Trans i18nKey="common:doctor" />} />

      <PageBody>
        <div>TBD</div>
      </PageBody>
    </>
  );
}

export default DoctorGuard(DoctorPage);
