export const MedReportSmallLogo = () => {
  return (
    <svg
      width="21"
      height="21"
      viewBox="0 0 21 21"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <path
        d="M20.7002 11.7002C15.7296 11.7002 11.7002 15.7296 11.7002 20.7002H8.10059C8.10059 13.7414 13.7414 8.10059 20.7002 8.10059V11.7002ZM12.8994 0.299805C12.8994 7.25859 7.25859 12.8994 0.299805 12.8994V9.2998C5.27037 9.2998 9.2998 5.27037 9.2998 0.299805H12.8994Z"
        fill="#0A5328"
      />
    </svg>
  );
};
